%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{10}

\bibitem{Balibrea-Correa_etal2021} Balibrea-Correa, J., Lerendegui-Marco, J., Calvo, D., Caballero, L., Babiano, V., Ladarescu, I., et al. (2021). A first prototype of C6D6 total-energy detector with SiPM readout for neutron capture time-of-flight experiments. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{985}, 164709--8pp.

\end{thebibliography}

\end{document}

