%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Guerrero_etal2012} Guerrero, C., Cano-Ott, D., Mendoza, E., Tain, J. L., Algora, A., Berthoumieux, E., et al. (2012). Monte Carlo simulation of the n_TOF Total Absorption Calorimeter. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{671}, 108--117.

\end{thebibliography}

\end{document}

