%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Jaworski_etal2012} Jaworski, G., Palacz, M., Nyberg, J., de Angelis, G., de France, G., Di Nitto, A., et al. (2012). Monte Carlo simulation of a single detector unit for the neutron detector array NEDA. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{673}, 64--72.

\end{thebibliography}

\end{document}

