%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Andricek_etal2011} Andricek, L. et al, Lacasta, C., Marinas, C., \& Vos, M. (2011). Intrinsic resolutions of DEPFET detector prototypes measured at beam tests. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{638}(1), 24--32.

\end{thebibliography}

\end{document}

