%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Barrientos_etal2024} Barrientos, L., Borja-Lloret, M., Casa{\~n}a, J. V., Dendooven, P., Garcia Lopez, J. G., Hueso-Gonzalez, F., et al. (2024). Gamma-ray sources imaging and test-beam results with MACACO III Compton camera. \textit{Phys. Medica}, \textit{117}, 103199--10pp.

\end{thebibliography}

\end{document}

