%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Barrientos_etal2023} Barrientos, L., Borja-Lloret, M., Casana, J. V., Hueso-Gonzalez, F., Ros, A., Roser, J., et al. (2023). System characterization and performance studies with MACACO III Compton camera. \textit{Radiat. Phys. Chem.}, \textit{208}, 110922--13pp.

\end{thebibliography}

\end{document}

