%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Vinals_etal2021} Vi{\~n}als, S., Nacher, E., Tengblad, O., Borge, M. J. G., Briz, J. A., Gad, A., et al. (2021). Calibration and response function of a compact silicon-detector set-up for charged-particle spectroscopy using GEANT4. \textit{Eur. Phys. J. A}, \textit{57}(2), 49--9pp.

\end{thebibliography}

\end{document}

