%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Ruhr_etal2020} Ruhr, F. et al, Escobar, C., \& Mi{\~n}ano, M. (2020). Testbeam studies of barrel and end-cap modules for the ATLAS ITk strip detector before and after irradiation. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{979}, 164430--6pp.

\end{thebibliography}

\end{document}

