%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Albiol_etal2016} Albiol, F., Corbi, A., \& Albiol, A. (2016). Geometrical Calibration of X-Ray Imaging With RGB Cameras for 3D Reconstruction. \textit{IEEE Trans. Med. Imaging}, \textit{35}(8), 1952--1961.

\end{thebibliography}

\end{document}

