%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Ullan_etal2014} Ullan, M., Benitez, V., Quirion, D., Zabala, M., Pellegrini, G., Lozano, M., et al. (2014). Low-resistance strip sensors for beam-loss event protection. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{765}, 252--257.

\end{thebibliography}

\end{document}

