%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Diez_etal2014} Diez, S. et al, Bernabeu Verd{\~A}{\textordmasculine}, J., Civera, J. V., Garcia, C., Garcia-Argos, C., Lacasta, C., et al. (2014). A double-sided, shield-less stave prototype for the ATLAS Upgrade strip tracker for the High Luminosity LHC. \textit{J. Instrum.}, \textit{9}, P03012--16pp.

\end{thebibliography}

\end{document}

