%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Llosa_etal2012} Llosa, G., Barrio, J., Cabello, J., Crespo, A., Lacasta, C., Rafecas, M., et al. (2012). Detector characterization and first coincidence tests of a Compton telescope based on LaBr3 crystals and SiPMs. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{695}, 105--108.

\end{thebibliography}

\end{document}

