%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Agarwalla_etal2011} Agarwalla, S. K., Conrad, J. M., \& Shaevitz, M. H. (2011). Short-baseline neutrino oscillation waves in ultra-large liquid scintillator detectors. \textit{J. High Energy Phys.}, \textit{12}(12), 085--24pp.

\end{thebibliography}

\end{document}

