%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{n_TOFCollaborationSarmento_etal2011} n_TOF Collaboration(Sarmento, R. et al), Domingo-Pardo, C., \& Tain, J. L. (2011). Measurement of the (236)U(n, f) cross section from 170 meV to 2 MeV at the CERN n_TOF facility. \textit{Phys. Rev. C}, \textit{84}(4), 044618--10pp.

\end{thebibliography}

\end{document}

