%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{NEMO-3CollaborationArnoldR.etal_etal2011} NEMO-3 Collaboration(Arnold R. et al), Martin-Albo, J., \& Novella, P. (2011). Measurement of the beta beta Decay Half-Life of (130)Te with the NEMO-3 Detector. \textit{Physical Review Letters}, \textit{107}(6), 062504.

\end{thebibliography}

\end{document}

