%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Domingo-Pardo_etal2011} Domingo-Pardo, C., Goel, N., Engert, T., Gerl, J., Kojouharov, I., Schaffner, H., et al. (2011). A novel gamma-ray imaging method for the pulse-shape characterization of position sensitive semiconductor radiation detectors. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{643}(1), 79--88.

\end{thebibliography}

\end{document}

