%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Bout_etal2024} Bout, R., Busto, J., Cecchini, V., Charpentier, P., Chapellier, M., Dastgheibi-Fard, A., et al. (2024). Perspectives of a single-anode cylindrical chamber operating in ionization mode and high gas pressure. \textit{Eur. Phys. J. C}, \textit{84}(5), 512--14pp.

\end{thebibliography}

\end{document}

