%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Andreotti_etal2024} Andreotti, M. et al, Cervera-Villanueva, A., Garcia-Peris, M. a., Martin-Albo, J., Querol, M., Rocabado, J., et al. (2024). Cryogenic characterization of Hamamatsu HWB MPPCs for the DUNE photon detection system. \textit{J. Instrum.}, \textit{19}(1), T01007--27pp.

\end{thebibliography}

\end{document}

