%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Abgrall_etal2011} Abgrall, N. et al, Cervera-Villanueva, A., Escudero, L., Monfregola, L., \& Stamoulis, P. (2011). Time projection chambers for the T2K near detectors. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{637}(1), 25--46.

\end{thebibliography}

\end{document}

