%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Alonso-Gonzalez_etal2023} Alonso-Gonzalez, D., Amaral, D. W. P., Bariego-Quintana, A., Cerde{\~n}o, D., \& de los Rios, M. (2023). Measuring the sterile neutrino mass in spallation source and direct detection experiments. \textit{J. High Energy Phys.}, \textit{12}(12), 096--27pp.

\end{thebibliography}

\end{document}

