%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{NEXTCollaborationByrnes_etal2023} NEXT Collaboration(Byrnes, N. K. et al), Carcel, S., Carrion, J. V., Lopez, F., Lopez-March, N., Martin-Albo, J., et al. (2023). NEXT-CRAB-0: a high pressure gaseous xenon time projection chamber with a direct VUV camera based readout. \textit{J. Instrum.}, \textit{18}(8), P08006--33pp.

\end{thebibliography}

\end{document}

