%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{n_TOFCollaborationSosnin_etal2023} n_TOF Collaboration(Sosnin, N. V. et al.), Babiano-Suarez, V., Caballero, L., Domingo-Pardo, C., Ladarescu, I., \& Tain, J. L. (2023). Measurement of the 77Se(n,gamma) cross section up to 200 keV at the n_TOF facility at CERN. \textit{Phys. Rev. C}, \textit{107}(6), 065805--9pp.

\end{thebibliography}

\end{document}

