%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Figueroa_etal2023} Figueroa, D. G., Florio, A., Torrenti, F., \& Valkenburg, W. (2023). CosmoLattice: A modern code for lattice simulations of scalar and gauge field dynamics in an expanding universe. \textit{Comput. Phys. Commun.}, \textit{283}, 108586--13pp.

\end{thebibliography}

\end{document}

