%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Viegas_etal2023} Viegas, R., Roser, J., Barrientos, L., Borja-Lloret, M., Casa{\~n}a, J. V., Lopez, J. G., et al. (2023). Characterization of a Compton camera based on the TOFPET2 ASIC. \textit{Radiat. Phys. Chem.}, \textit{202}, 110507--11pp.

\end{thebibliography}

\end{document}

