%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{KM3NeTCollaborationAiello_etal2022} KM3NeT Collaboration(Aiello, S. et al), Alves Garre, S., Calvo, D., Carretero, V., Colomer, M., Gozzini, S. R., et al. (2022). Nanobeacon: A time calibration device for the KM3NeT neutrino telescope. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{1040}, 167132--13pp.

\end{thebibliography}

\end{document}

