%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{DUNECollaborationAbud_etal2022} DUNE Collaboration(Abud, A. A. et al), Antonova, M., Barenboim, G., Cervera-Villanueva, A., De Romeri, V., Fernandez Menendez, P., et al. (2022). Scintillation light detection in the 6-m drift-length ProtoDUNE Dual Phase liquid argon TPC. \textit{Eur. Phys. J. C}, \textit{82}(7), 618--29pp.

\end{thebibliography}

\end{document}

