%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Roca_etal2022} Roca, L., Liang, W. H., \& Oset, E. (2022). Inconsistency of the data on the K-1(1270) -> pi K-0*(1430) decay width. \textit{Phys. Lett. B}, \textit{824}, 136827--3pp.

\end{thebibliography}

\end{document}

