%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Wieduwilt_etal2021} Wieduwilt, P., Paschen, B., Schreeck, H., Schwenker, B., Soltau, J., Ahlburg, P., et al. (2021). Performance of production modules of the Belle II pixel detector in a high-energy particle beam. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{991}, 164978--15pp.

\end{thebibliography}

\end{document}

