%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Calatayud-Jordan_etal2021} Calatayud-Jordan, J., Candela-Juan, C., Palma, J. D., Pujades-Claumarchirant, M. C., Soriano, A., Gracia-Ochoa, M., et al. (2021). Influence of the simultaneous calibration of multiple ring dosimeters on the individual absorbed dose. \textit{J. Radiol. Prot.}, \textit{41}(2), 384--397.

\end{thebibliography}

\end{document}

