%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Labiche_etal2010} Labiche, M. et al, Caballero, L., \& Rubio, B. (2010). TIARA: A large solid angle silicon array for direct reaction studies with radioactive beams. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{614}(3), 439--448.

\end{thebibliography}

\end{document}

