%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Vnuchenko_etal2020} Vnuchenko, A., Esperante Pereira, D., Gimeno, B., Benedetti, S., Catalan Lasheras, N., Garlasch, M., et al. (2020). High-gradient testing of an S-band, normal-conducting low phase velocity accelerating structure. \textit{Phys. Rev. Accel. Beams}, \textit{23}(8), 084801--13pp.

\end{thebibliography}

\end{document}

