%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Saha_etal2020} Saha, S., Arici, T., Gerl, J., Gorska, M., Pietralla, N., Davinson, T., et al. (2020). On the 6-detection efficiency of a combined Si and plastic stack detector for DESPEC. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{975}, 164196--8pp.

\end{thebibliography}

\end{document}

