%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Etxebeste_etal2020} Etxebeste, A., Dauvergne, D., Fontana, M., Letang, J. M., Llosa, G., Mu{\~n}oz, E., et al. (2020). CCMod: a GATE module for Compton camera imaging simulation. \textit{Phys. Med. Biol.}, \textit{65}(5), 055004--17pp.

\end{thebibliography}

\end{document}

