%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{NEXTCollaborationRenner_etal2019} NEXT Collaboration(Renner, J. et al), Kekic, M., Martinez-Lema, G., Alvarez, V., Benlloch-Rodriguez, J. M., Carcel, S., et al. (2019). Energy calibration of the NEXT-White detector with 1\% resolution near Q(beta beta) of Xe-136. \textit{J. High Energy Phys.}, \textit{10}(10), 230--13pp.

\end{thebibliography}

\end{document}

