%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{n_TOFCollaborationGawlik_etal2019} n_TOF Collaboration(Gawlik, A. et al), Domingo-Pardo, C., Tain, J. L., \& Tarife{\~n}o-Saldivia, A. (2019). Measurement of the Ge-70(n, gamma) cross section up to 300 keV at the CERN n_TOF facility. \textit{Phys. Rev. C}, \textit{100}(4), 045804--10pp.

\end{thebibliography}

\end{document}

