%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{n_TOFCollaborationMosconi_etal2010} n_TOF Collaboration(Mosconi, M. et al), Domingo-Pardo, C., \& Tain, J. L. (2010). Neutron physics of the Re/Os clock. I. Measurement of the (n, gamma) cross sections of Os-186,Os-187,Os-188 at the CERN n_TOF facility. \textit{Phys. Rev. C}, \textit{82}(1), 015802--10pp.

\end{thebibliography}

\end{document}

