%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Testov+Gadea2019} Testov, D. et al, \& Gadea, A. (2019). The 4pi highly-efficient light-charged-particle detector EUCLIDES, installed at the GALILEO array for in-beam gamma-ray spectroscopy. \textit{Eur. Phys. J. A}, \textit{55}(4), 47--8pp.

\end{thebibliography}

\end{document}

