%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Garcia-Cases_etal2018} Garcia-Cases, F., Perez-Calatayud, J., Ballester, F., Vijande, J., \& Granero, D. (2018). Peripheral dose around a mobile linac for intraoperative radiotherapy: radiation protection aspects. \textit{J. Radiol. Prot.}, \textit{38}(4), 1393--1411.

\end{thebibliography}

\end{document}

