%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Brook_etal2018} Brook, N. H., Castillo Garcia, L., Conneely, T. M., Cussans, D., van Dijk, M. W. U., Fohl, K., et al. (2018). Testbeam studies of a TORCH prototype detector. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{908}, 256--268.

\end{thebibliography}

\end{document}

