%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Gimenez-Alventosa_etal2018} Gimenez-Alventosa, V., Gimenez, V., Ballester, F., Vijande, J., \& Andreo, P. (2018). Correction factors for ionization chamber measurements with the {\textquoteright}Valencia{\textquoteright} and {\textquoteright}large field Valencia{\textquoteright} brachytherapy applicators. \textit{Phys. Med. Biol.}, \textit{63}(12), 125004--10pp.

\end{thebibliography}

\end{document}

