%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Quintero-Quintero_etal2018} Quintero-Quintero, A., Pati{\~n}o-Camargo, G., Soriano, A., Palma, J. D., Vilar-Palop, J., Pujades, M. C., et al. (2018). Calibration of a thermoluminescent dosimeter worn over lead aprons in fluoroscopy guided procedures. \textit{J. Radiol. Prot.}, \textit{38}(2), 549--563.

\end{thebibliography}

\end{document}

