%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{n_TOFCollaborationBarbagallo_etal2018} n_TOF Collaboration(Barbagallo, M. et al), Domingo-Pardo, C., \& Tain, J. L. (2018). Experimental setup and procedure for the measurement of the Be-7(n,p)Li-7 reaction at n_TOF. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{887}, 27--33.

\end{thebibliography}

\end{document}

