%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{n_TOFCollaborationWright_etal2017} n_TOF Collaboration(Wright, T. et al), Domingo-Pardo, C., Giubrone, G., Tain, J. L., \& Tarife{\~n}o-Saldivia, A. (2017). Measurement of the U-238(n,gamma) cross section up to 80 keV with the Total Absorption Calorimeter at the CERN n_TOF facility. \textit{Phys. Rev. C}, \textit{96}(6), 064601--11pp.

\end{thebibliography}

\end{document}

