%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Ma_etal2017} Ma, Y. Z., Vijande, J., Ballester, F., Tedgren, A. C., Granero, D., Haworth, A., et al. (2017). A generic TG-186 shielded applicator for commissioning model-based dose calculation algorithms for high-dose-rate Ir-192 brachytherapy. \textit{Med. Phys.}, \textit{44}(11), 5961--5976.

\end{thebibliography}

\end{document}

