%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Molina_etal2017} Molina, F., Aguilera, P., Romero-Barrientos, J., Arellano, H. F., Agramunt, J., Medel, J., et al. (2017). Energy distribution of the neutron flux measurements at the Chilean Reactor RECH-1 using multi-foil neutron activation and the Expectation Maximization unfolding algorithm. \textit{Appl. Radiat. Isot.}, \textit{129}, 28--34.

\end{thebibliography}

\end{document}

