%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{AGATACollaborationClement_etal2017} AGATA Collaboration(Clement, E. et al), Domingo-Pardo, C., Gadea, A., Perez-Vidal, R. M., \& Civera, J. V. (2017). Conceptual design of the AGATA 1 pi array at GANIL. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{855}, 1--12.

\end{thebibliography}

\end{document}

