%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Poley_etal2016} Poley, L. et al, Lacasta, C., \& Soldevila, U. (2016). Characterisation of strip silicon detectors for the ATLAS Phase-II Upgrade with a micro-focused X-ray beam. \textit{J. Instrum.}, \textit{11}, P07023--12pp.

\end{thebibliography}

\end{document}

