%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Gomez-Cadenas_etal2016} Gomez-Cadenas, J. J., Benlloch-Rodriguez, J. M., Ferrario, P., Monrabal, F., Rodriguez, J., \& Toledo, J. F. (2016). Investigation of the coincidence resolving time performance of a PET scanner based on liquid xenon: a Monte Carlo study. \textit{J. Instrum.}, \textit{11}, P09011--18pp.

\end{thebibliography}

\end{document}

