%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Liu_etal2016} Liu, S., Bogard, F., Cornebise, P., Faus-Golfe, A., Fuster-Martinez, N., Griesmayer, E., et al. (2016). In vacuum diamond sensor scanner for beam halo measurements in the beam line at the KEK Accelerator Test Facility. \textit{Nucl. Instrum. Methods Phys. Res. A}, \textit{832}, 231--242.

\end{thebibliography}

\end{document}

