%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Granero_etal2016} Granero, D., Candela-Juan, C., Vijande, J., Ballester, F., Perez-Calatayud, J., Jacob, D., et al. (2016). Technical Note: Dosimetry of Leipzig and Valencia applicators without the plastic cap. \textit{Med. Phys.}, \textit{43}(5), 2087--4pp.

\end{thebibliography}

\end{document}

